KING KRULE share new live film ‘You’ll Never Guess What Happened Next’

WORLD TOUR CONTINUES WITH FORTHCOMING HEADLINE SHOWS IN LOS ANGELES, LONDON, PARIS AND MORE Following the release of the critically acclaimed album Space Heavy, King Krule returns with ‘You’ll Never Guess What Happened Next’, a brand new live performance film directed and shot by filmmaker Anna Pollack (Blair, LOLAHOL, Tobias). Earlier this year, King Krule performed a handful of intimate stripped-back live shows across Europe and America as part of the ‘SHHHH Tour’ with bandmates Ignacio Salvadores (Saxophonist) and George Bass (Drummer). “You’ll Never Guess What Happened Next” brings live recordings of seven songs from the show at The Stephen